Robalec Soup Kettle 10.8 litre

Simple to use and attractive styling, this soup kettle keeps cooked soup warm until serving

Large 10.8 litre capacity

Durable and power-saving design

Can be taken apart for easy cleaning

Glass filled nylon outer casing for reduced heat transfer

Rim designed to return condensation back into soup

Designed to accommodate ladle handle when the lid is closed

Hinged lid for stirring and serving

The post Robalec Soup Kettle 10.8 litre appeared first on Liteco Hospitality.